2 DSPBUG

         Name: DSPBUG
         Type: Assembler Program
      Version: 2.0
 Date Entered: 20-Aug-88
  Last Change: 20-Aug-88

  Description: Debugging Monitor for the DSP56000

 DSPBUG is a debugging monitor for the DSP56000.  DSPBUG may be used
 to provide downloading and debugging capability in prototype boards.
 DSPBUG assumes a serial port for operation.  Two serial ports on
 a memory mapped DUART is the assumed mode of operation for DSPBUG
 although DSPBUG may be configured to operate via the on-chip SCI
 or HOST interface.  For more information on the configuration,
 booting modes and operation of DSPBUG, see the source DSPBUG.ASM.

 The following files are supplied with the DSPBUG distribution:
    bootgen.for - FORTRAN program for VAX/VMS to convert the DSPBUG.LOD
                  file into two bootable EPROMs.  This assumes that
                  DSPBUG is booting in mode 1.
    bugequ.asm  - Assembler source program containing symbolic equates for
                  accessing DSPBUG's internal subroutines.
    dspbug.asm  - Assembler source program of DSPBUG.  This should be 
                  assembled as: asm56000 -l -b -a dspbug.
    dspbug.low  - Motorola S19 Hex file of the low EPROM for booting in
                  mode 1.
    dspbug.mid  - Motorola S19 Hex file of the middle EPROM for booting in
                  mode 1.
    dspbug.mod  - Module control file for program BOOTGEN.
    dspbug.p    - Motorola S19 Hex file of the 32Kx8 EPROM for booting in
                  mode 3.
    dspbug.p0   - Motorola S19 Hex file of the low byte EPROM for booting
                  in mode 2.
    dspbug.p1   - Motorola S19 Hex file of the middle byte EPROM for 
                  booting in mode 2.
    dspbug.p2   - Motorola S19 Hex file of the high byte EPROM for booting
                  in mode 2.
    iloader.asm - Intelligent loader for booting in mode 1.  This file is
                  included when using BOOTGEN.
    manual.mem  - The full manual describing DSPBUG.


